\documentclass[10pt,letterpaper, final]{report} % \documentclass{} required in all files

\usepackage{../preamble/myWEPS} % This is now our single preamble file inclusion (it assumes a “.sty” file extension)

\usepackage{multirow}

\begin{document}

This Exercise section of the WEPS User Guide
is useful for introducing some basic skills needed to perform
simple wind erosion simulations with WebStart WEPS
and to explain step by step how specific scenarios can be handled
using WebStart WEPS.\footnote{
Note that these exercises are run using the NRCS configured build of WebStart WEPS.
Other configured builds of WebStart WEPS should generally produce the same
(or at least very similar) results and may also report values in SI units,
depending upon configuration settings.
It is also possible that the results may not be identical
due to recent changes/updates made to the science model code
and/or the database records since these exercises were last reviewed.}

\section{Configuring WEPS to run these Exercises}
	\label{sec:Configuring_WEPS_to_run_these_Exercises}
Startup WebStart WEPS to open the main WEPS interface.
The user’s name and email address are required to help track
any comment or error messages sent by the user.
If it is the user’s first time running WEPS, the “WEPS Wizard” should display
and lead the user through the process of setting their name and email address
into the WEPS local configuration file.
Alternatively, if WEPS has been initiated previously
and the user did not complete their name and email as desired,
the user can select the \textbf{Welcome Wizard} option in the \textbf{Help} menu
from the main WEPS screen to redisplay the Welcome Wizard panels again.

For training purposes,
the default WEPS Run location should be specified as a \textit{Runs} folder
inside the current WEPS Project and displayed as such
in the upper left corner of the main WEPS interface screen (Runs Location panel)
which is highlighted within a \inlinebox[colframe=red]{red box frame}
in \cref{fig:The_WEPS_main_interface_with_default_settings}.\footnote{Note that \inlinebox[colframe=red]{{red box frames}}
are added for instructional/identification purposes in select images throughout these exercises
and are not seen in the actual WEPS display windows.}
Note that this is the initial default configured WEPS Run folder name and location
upon installation of WebStart WEPS.
That default WEPS Run folder name and path are defined as follows on a Microsoft Windows computer system:

\begin{itemize}
\item[]
\textbf{
\textit{C:$\backslash$Users$\backslash$\$\{user.name\}$\backslash$Documents$\backslash$WEPS Files$\backslash$\$\{current\_proj.name\}$\backslash$Runs}}
\end{itemize}

where:

\begin{itemize}
\item[]
\textbf{\textit{\$\{user.name\}}} refers to the user’s login name
(\textbf{Larry Wagner} as shown in
\cref{fig:The_WEPS_main_interface_with_default_settings})

\item[and]
\item[]
\textbf{\textit{\$\{current\_proj.name\}}} refers to the current WEPS Project
(\textbf{Project.wpj} as shown in
\cref{fig:The_WEPS_main_interface_with_default_settings}).
\end{itemize}

Thus, the default Runs location translates to the following path shown in \cref{fig:The_WEPS_main_interface_with_default_settings} to:

\begin{itemize}
\item[]
\textbf{
\textit{C:$\backslash$Users$\backslash$Larry Wagner$\backslash$Documents$\backslash$WEPS Files$\backslash$Project.wpj$\backslash$Runs}}
\end{itemize}

\begin{figure}[H]
\centering
	\includegraphics[scale=1.5]{images/Examples/WEPS_main_interface_screen}
\caption{The WEPS main interface with default \textbf{Runs Location} setting.}
\label{fig:The_WEPS_main_interface_with_default_settings}
\end{figure}

\textbf{Enable System Templates}:
We will be using NRCS Crop Management Zone (CMZ) templates
as well as templates specially created for several exercises.
Ensure that both \textit{System Mgt. Templates} and
\textit{CRLMOD (CMZ) Mgt. Templates} are enabled
in the Configuration Panel.
To access the Configuration Panel, select the \textbf{Edit Configuration}
option under the \textbf{Tools} menu
within the main WEPS interface.
Within the Configuration window, click on the \textit{Project and Data Loc} tab.
Look under the \textit{Management Template Locations} section
and make sure there is a check mark in the box
just right of the \textit{System Mgt Templates} and 
\textit{CRLMOD (CMZ) Mgt. Templates}
fields (\cref{fig:Enabling_System_Mgt_Templates_in_WEPS_Project_and_Data_Loc_Tab}).
Note that the \textit{CRLMOD (CMZ) mgt. Templates} field should already be checkmarked by default.

\begin{figure}[H]
\centering
	\includegraphics[scale=1.6]{images/Examples/System_templates_enable.jpg}
\caption{Enabling \textbf{System Mgt Templates} under the WEPS Configuration Panel's
\textit{Project and Data Loc} Tab.}
\label{fig:Enabling_System_Mgt_Templates_in_WEPS_Project_and_Data_Loc_Tab}
\end{figure}

After making this change in the Configuration Panel,
one can force the \textit{System Mgt Templates} option to immediately display
in the drop down choice list
(\cref{fig:Man_drop_down_choice_list_1}).
The user can do so
either by selecting the \textbf{Refresh the Mgt and Soil Dropdown Choice List} option
under the \textbf{Tools} menu
or click on the refresh button
{\scalerel*{\includegraphics{images/icons/Refresh_button.jpg}}{\strut}
located just left of the management field's drop down choice list down arrow button
{\scalerel*{\includegraphics{images/icons/down_arrow.png}}{\strut}
to trigger the refresh.

\begin{figure}[H]
\centering
	\includegraphics[scale=1.8]{images/Examples/Man_drop_down_choice_list_1.jpg}
\caption{Management drop down choice list displaying the \textbf{System Templates} option.}
\label{fig:Man_drop_down_choice_list_1}
\end{figure}

After ensuring that WebStart WEPS is configured as specified,
the user should now be able to follow the steps outlined
for each Exercise as specified in this User's Guide.

\end{document}