\documentclass[10pt,letterpaper, final]{report} % \documentclass{} required in all files
 
\usepackage{../preamble/myWEPS} % This is now our single preamble file inclusion (it assumes a “.sty” file extension)

%% At least these three packages are necessary if we don't use the preamble "myWEPS" included above
%% Which already includes them - LEW 
%\usepackage{float}
%\usepackage{multirow}
%\usepackage{multicol}

\begin{document}
 
 
\begin{figure}[H]
\centering
 
\begingroup
%    \normalsize {
    \footnotesize {
    \begin{verbatim}
#    WIND_GEN3  $Revision: 1.12 $ Hourly values per day @output
# station: 13985 DODGE_CITY, KS  USA
# lat:  37deg  46min N  lon:  99deg  58min W
# period: 19610421-19781231  el: 796m
# day mo year dir   hr1   hr2   hr3   hr4   hr5   hr6   hr7   hr8   hr9 .  .  .
#             deg   m/s   m/s   m/s   m/s   m/s   m/s   m/s   m/s   m/s .  .  .
# -----------------------------------------------------------------------------
 1  1    1   0.0   3.7   4.7   6.1   6.4   6.9   7.7   8.3   9.3  14.4  .  .  .
 2  1    1 180.0   3.5   4.7   5.5   5.8   6.4   6.9   7.5   7.9   8.5  .  .  .
 3  1    1   0.0   3.7   4.7   6.1   6.4   6.8   7.7   8.1   9.3  12.1  .  .  .
 4  1    1 157.5   2.9   3.5   4.1   4.3   4.6   5.0   5.4   5.6   7.4  .  .  .
 5  1    1 135.0   2.3   2.9   3.5   3.8   4.5   4.8   5.4   6.0   8.2  .  .  .
 6  1    1  22.5   3.5   4.6   5.2   5.8   6.6   7.2   7.9   8.8  11.0  .  .  .
 7  1    1 180.0   3.8   4.9   5.6   5.8   6.5   7.1   7.7   8.0   9.4  .  .  .
 8  1    1 202.5   4.0   4.8   5.2   5.7   5.9   6.2   6.7   7.2   8.1  .  .  .
 9  1    1  22.5   3.5   4.6   5.1   5.8   6.4   7.1   7.7   8.8  10.3  .  .  .
10  1    1 135.0   2.1   2.8   3.4   3.8   4.4   4.7   5.3   5.8   6.7  .  .  .
11  1    1 202.5   4.2   5.0   5.3   5.7   5.9   6.4   6.9   7.4   9.5  .  .  .
12  1    1 337.5   3.1   3.6   4.4   4.9   5.5   6.5   7.1   8.0   9.0  .  .  .
13  1    1 270.0   3.0   3.3   3.8   4.2   4.6   4.8   5.0   5.5   6.3  .  . .
14  1    1   0.0   3.6   4.4   5.7   6.3   6.6   7.2   7.9   9.0  10.1  .  .  .
15  1    1   0.0   3.7   4.5   6.1   6.3   6.7   7.7   8.0   9.1  11.3  .  .  .
16  1    1 157.5   2.5   3.4   3.9   4.3   4.5   4.9   5.2   5.6   6.1  .  .  .
17  1    1 292.5   3.4   4.0   4.3   4.6   5.2   5.4   5.8   6.2   7.2  .  .  .
18  1    1  22.5   3.3   4.5   5.0   5.6   6.2   7.0   7.7   8.5   9.0  .  .  .
19  1    1 157.5   3.0   3.6   4.1   4.4   4.7   5.1   5.4   5.7   8.2  .  .  .
20  1    1 180.0   3.8   4.8   5.6   5.8   6.4   7.0   7.7   8.0   8.9  .  .  .
21  1    1   0.0   3.7   4.4   6.0   6.3   6.7   7.5   8.0   9.1  10.5  .  .  .
22  1    1  22.5   3.5   4.7   5.2   5.8   6.6   7.3   8.0   8.9  11.7  .  .  .
23  1    1 270.0   3.1   3.4   3.9   4.2   4.6   4.8   5.0   5.5   6.5  .  .  .
24  1    1 135.0   2.0   2.8   3.4   3.7   4.2   4.7   5.3   5.8   6.5  .  .  .
25  1    1 157.5   2.7   3.5   4.0   4.3   4.5   5.0   5.2   5.6   6.9  .  .  .
26  1    1  22.5   3.4   4.6   5.1   5.7   6.2   7.1   7.7   8.6   9.7  .  .  .
27  1    1 180.0   3.8   4.9   5.6   6.0   6.6   7.1   7.7   8.0  10.0  .  .  .
28  1    1 315.0   2.8   3.5   4.1   4.5   4.9   5.5   6.1   6.4   7.1  .  .  .
29  1    1 202.5   4.0   4.9   5.2   5.7   5.9   6.2   6.7   7.2   8.4  .  .  .
30  1    1 247.5   2.6   3.1   3.6   4.2   4.5   4.9   5.2   5.6   6.7  .  .  .
31  1    1   0.0   3.7   4.4   5.9   6.5   7.4   8.2   9.2  10.1  12.2  .  .  .
 .  .    .    .     .     .     .     .     .     .     .     .     .   .  .  .
 .  .    .    .     .     .     .     .     .     .     .     .     .   .  .  .
 .  .    .    .     .     .     .     .     .     .     .     .     .   .  .  .
    \end{verbatim}
    }
\endgroup
 
\caption{Testing display of an ASCII file.}
\label{fig:ASCII_file1}
\end{figure}
 
 
\begin{figure}[H]
\centering
 
\begingroup
%	\normalsize {
    \footnotesize {
    \begin{verbatim}  
#------------ WEPS SIMULATION RUN FILE ------------
# Note: Lines beginning with '#' are comment lines.
#       Lines beginning with '#   RFD' are comments used by the interface.
#
# --USER INFORMATION
#   RFD-UserName
Dustin Fields
#   RFD-FieldNo RFD-TractNo RFD-FarmNo RFD-RunMode RFD-RunCycle RFD-RotCycle
789 | 456 | 123 | cycle | 2 | 2
#   RFD-SiteCounty and SiteState
Finney, Kansas
#
# --SITE INFORMATION
#   RFD-LatitudeSign RFD-Latitude
+38.00
    \end{verbatim}
    }
\endgroup
 
\caption{Testing display of a short ASCII file.}
\label{fig:ASCII_file2}
\end{figure}
 
 
\begin{figure}[H]
\begin {multicols}{2}

%\tiny {
%\scriptsize {
\footnotesize {
%\small {
%\normalsize {
    \begin{verbatim}  
#------------ WEPS SIMULATION RUN FILE ------------
# Note: Lines beginning with '#' are comment lines.
#       Lines beginning with '#   RFD' are comments used by the interface.
#
# --USER INFORMATION
#   RFD-UserName
Dustin Fields
#   RFD-FieldNo RFD-TractNo RFD-FarmNo RFD-RunMode RFD-RunCycle RFD-RotCycle
789 | 456 | 123 | cycle | 2 | 2
#   RFD-SiteCounty and SiteState
Finney, Kansas
#
# --SITE INFORMATION
#   RFD-LatitudeSign RFD-Latitude
+38.00
#   RFD-LongitudeSign RFD-Longitude
-100.66
#   RFD-Elevation (meters)
801
#   RFD-CliGenStationID
CIMARRON
#   RFD-WindGenStationID
GARDEN CITY MUNI
#
# --SIMULATION PERIOD
#   RFD-StartDate (day_month_year)
01 01 01
#   RFD-EndDate (day_month_year)
31 12 4
#   RFD-TimeSteps (per_day)
24
#
# --RUN FILE NAMES (INPUT)
#   RFD-climate file
cli_gen.cli
#   RFD-wind file
win_gen.win
#   RFD-sub-daily file
none
#   RFD-SoilFile
Otero_101OF_100_FSL.ifc
#   RFD-ManageFile
KS_wheat_fallow.man
#
# --WEPS OUTPUT OPTIONS
#   RFD-OutputFile
output.tmp
#   RFD-ReportForm
0 0 0 0 0 0
#   RFD-OutputPeriod
2
#   RFD-SubmodelOutput
0 0 0 0 0 0
#   RFD-DebugOutput
0 0 0 0 0
#
# --SIMULATION REGION INFORMATION
#   RFD-RegionAngle (deg_clockwise_north)
21
#   RFD-SimCoords1 (meters)
0.0  0.0
#   RFD-SimCoords2 (meters)
1500.2  1500
#   RFD-ScaleFactors (place holder - needed for older versions of WEPS)
5.5 5.5
#
#   RFD-AcctRegNo
1
#   RFD-AcctCoords1 (meters)
    0.0  0.0 
#   RFD-AcctCoords2 (meters)
1500.2  1500
#
#   RFD-SubregionNo
1
#   RFD-SubCoords1 (meters)
0.0  0.0
#   RFD-SubCoords2 (meters)
1500.2  1500
#   RFD-AverageSlope (%)
0.50
#  --BARRIERS
#   RFD-NumberBar
2
#   RFD-BarrierCoord1 (meters)
-1 0
#   RFD-BarrierCoords2 (meters)
0 1500
#   RFD-BarrierType
Snow fence
#   RFD-BarrierHeight (meters)
1.2
#   RFD-BarrierWidth (meters)
1
#   RFD-BarrierPorosity (%)
0.6
#   RFD-BarrierCoord (meters)
0 -2
1500.2 0
#   RFD-BarrierType
Sorghum(2 row)
#   RFD-BarrierHeight (meters)
2
#   RFD-BarrierWidth (meters)
2
#   RFD-BarrierPorosity (%)
0.5
#
#---------- END OF SIMULATION RUN FILE ------------
    \end{verbatim}
}
 
\end {multicols}

\caption{Testing display of a 2-column ASCII file. Note when font is set to "normalsize" this file's contents cause an "Overfull hbox" warning message due to the contents being too long to fit on the page with the Figure caption.  By using the now included "moresize" package, one can specify smaller relative font sizes (footnotesize", which is 8pt font size, selected for this Figure gets the file contents to fit on a single page in 2-columns, but due to some lines still being too long (and now wrapping)in the two column display. Changing the font size specification even smaller can remedy this issue. Just make sure the font size selected is not too small to easily read it, if we take that approach to resolving this issue. Note that there are several "fontsize" examples commented out for use with this Figure in the source file.  Font size "tiny" (about 5pt font size) allows this file's contents to both fit on a single page and not wrap the long lines within their individual columns.}
\label{fig:ASCII_file3}
\end{figure}

\begin{figure}[H]
\centering
 
\begingroup
%    \normalsize {
    \footnotesize {
    \begin{verbatim}
5.30004
   1   0   0
  Station: +CIMARRON KS                                    CLIGEN VER. 5.30004 -r:    0 -I: 3
 Latitude Longitude Elevation (m) Obs. Years   Beginning year  Years simulated Command Line:
    37.74  -100.44         801          40           1             150          -S14 -s1522 -i/tmp/csip/work/07/10/cffc4817-2ec7-11ed-83b4-1555bb28cf1e/cligenRecordPrism.par -o/tmp/csip/work/07/10/cffc4817-2ec7-11ed-83b4-1555bb28cf1e/cli_gen.cli -b1 -y150 -t5 -I3 
 Observed monthly ave max temperature (C)
   7.0   9.2  14.3  19.7  24.7  30.0  33.3  32.3  28.0  21.1  13.6   7.2
 Observed monthly ave min temperature (C)
  -7.8  -5.9  -1.6   3.5   9.9  15.4  18.2  17.6  12.4   5.2  -2.1  -7.1
 Observed monthly ave solar radiation (Langleys/day)
 203.0 278.0 376.0 466.0 546.0 591.0 616.0 533.0 433.0 321.0 224.0 192.0
 Observed monthly ave precipitation (mm)
  13.9  15.8  38.4  44.6  72.8  88.7  76.7  69.8  40.5  41.4  18.9  18.0
 da mo year  prcp  dur   tp     ip  tmax  tmin  rad  w-vl w-dir  tdew
             (mm)  (h)               (C)   (C) (l/d) (m/s)(Deg)   (C)
  1  1    1   0.0  0.00 0.00   0.00  -3.9 -11.6 149.  5.0  272. -13.3
  2  1    1   0.0  0.00 0.00   0.00  -1.6 -11.4 231.  3.4   80.  -8.1
  3  1    1   0.0  0.00 0.00   0.00  10.3 -12.4 186.  5.8  303. -19.9
  4  1    1   0.0  0.00 0.00   0.00  12.1  -2.2 142.  4.5  251.   0.5
  5  1    1   0.0  0.00 0.00   0.00  25.5   4.6 131.  5.2  262.  12.4
  6  1    1   0.0  0.00 0.00   0.00   9.9  -0.2 165.  5.9   21.  -0.1
  7  1    1   0.0  0.00 0.00   0.00  16.3  -3.7 238.  3.5  163.  -2.4
  8  1    1   0.0  0.00 0.00   0.00  12.3  -2.7 227.  8.8  357.  -9.5

    \end{verbatim}
    }
\endgroup
 
\caption{Testing display of a Cligen ASCII output file.}
\label{fig:ASCII_file4}
\end{figure}


%\lstset{breaklines=true}
%\lstset{numbers=left, numberstyle=\scriptsize}
%\lstset{basicstyle=\footnotesize}
%\lstset{backgroundcolor=\color{lightgray}}
%\lstset{basicstyle=\small\ttfamily}
%\lstset{framesep=4pt}
\lstset{xleftmargin=.25in}

\begin{figure}[H]
\centering

\begingroup
    \begin{lstlisting}
5.30004
   1   0   0
  Station: +CIMARRON KS                                    CLIGEN VER. 5.30004 -r:    0 -I: 3
 Latitude Longitude Elevation (m) Obs. Years   Beginning year  Years simulated Command Line:
    37.74  -100.44         801          40           1             150          -S14 -s1522 -i/tmp/csip/work/07/10/cffc4817-2ec7-11ed-83b4-1555bb28cf1e/cligenRecordPrism.par -o/tmp/csip/work/07/10/cffc4817-2ec7-11ed-83b4-1555bb28cf1e/cli_gen.cli -b1 -y150 -t5 -I3 
 Observed monthly ave max temperature (C)
   7.0   9.2  14.3  19.7  24.7  30.0  33.3  32.3  28.0  21.1  13.6   7.2
 Observed monthly ave min temperature (C)
  -7.8  -5.9  -1.6   3.5   9.9  15.4  18.2  17.6  12.4   5.2  -2.1  -7.1
 Observed monthly ave solar radiation (Langleys/day)
 203.0 278.0 376.0 466.0 546.0 591.0 616.0 533.0 433.0 321.0 224.0 192.0
 Observed monthly ave precipitation (mm)
  13.9  15.8  38.4  44.6  72.8  88.7  76.7  69.8  40.5  41.4  18.9  18.0
 da mo year  prcp  dur   tp     ip  tmax  tmin  rad  w-vl w-dir  tdew
             (mm)  (h)               (C)   (C) (l/d) (m/s)(Deg)   (C)
  1  1    1   0.0  0.00 0.00   0.00  -3.9 -11.6 149.  5.0  272. -13.3
  2  1    1   0.0  0.00 0.00   0.00  -1.6 -11.4 231.  3.4   80.  -8.1
  3  1    1   0.0  0.00 0.00   0.00  10.3 -12.4 186.  5.8  303. -19.9
  4  1    1   0.0  0.00 0.00   0.00  12.1  -2.2 142.  4.5  251.   0.5
  5  1    1   0.0  0.00 0.00   0.00  25.5   4.6 131.  5.2  262.  12.4
  6  1    1   0.0  0.00 0.00   0.00   9.9  -0.2 165.  5.9   21.  -0.1
  7  1    1   0.0  0.00 0.00   0.00  16.3  -3.7 238.  3.5  163.  -2.4
  8  1    1   0.0  0.00 0.00   0.00  12.3  -2.7 227.  8.8  357.  -9.5

    \end{lstlisting}
\endgroup
 
\caption{Testing display of a Cligen ASCII output file.}
\label{fig:ASCII_file5}
\end{figure}

\begin{figure}[H]
%\begin {multicols}{2}
%\lstset{numbers=none}
%\lstset{framesep=15pt}
\setlength{\columnsep}{.25in}
%\lstset{xleftmargin=.25in}
    \begin{lstlisting}[multicols=2]  
#------------ WEPS SIMULATION RUN FILE ------------
# Note: Lines beginning with '#' are comment lines.
#       Lines beginning with '#   RFD' are comments used by the interface.
#
# --USER INFORMATION
#   RFD-UserName
Dustin Fields
#   RFD-FieldNo RFD-TractNo RFD-FarmNo RFD-RunMode RFD-RunCycle RFD-RotCycle
789 | 456 | 123 | cycle | 2 | 2
#   RFD-SiteCounty and SiteState
Finney, Kansas
#
# --SITE INFORMATION
#   RFD-LatitudeSign RFD-Latitude
+38.00
#   RFD-LongitudeSign RFD-Longitude
-100.66
#   RFD-Elevation (meters)
801
#   RFD-CliGenStationID
CIMARRON
#   RFD-WindGenStationID
GARDEN CITY MUNI
#
# --SIMULATION PERIOD
#   RFD-StartDate (day_month_year)
01 01 01
#   RFD-EndDate (day_month_year)
31 12 4
#   RFD-TimeSteps (per_day)
24
#
# --RUN FILE NAMES (INPUT)
#   RFD-climate file
cli_gen.cli
#   RFD-wind file
win_gen.win
#   RFD-sub-daily file
none
#   RFD-SoilFile
Otero_101OF_100_FSL.ifc
#   RFD-ManageFile
KS_wheat_fallow.man
#
# --WEPS OUTPUT OPTIONS
#   RFD-OutputFile
output.tmp
#   RFD-ReportForm
0 0 0 0 0 0
#   RFD-OutputPeriod
2
#   RFD-SubmodelOutput
0 0 0 0 0 0
#   RFD-DebugOutput
0 0 0 0 0
#
# --SIMULATION REGION INFORMATION
#   RFD-RegionAngle (deg_clockwise_north)
21
#   RFD-SimCoords1 (meters)
0.0  0.0
#   RFD-SimCoords2 (meters)
1500.2  1500
#   RFD-ScaleFactors (place holder - needed for older versions of WEPS)
5.5 5.5
#
#   RFD-AcctRegNo
1
#   RFD-AcctCoords1 (meters)
    0.0  0.0 
#   RFD-AcctCoords2 (meters)
1500.2  1500
#
#   RFD-SubregionNo
1
#   RFD-SubCoords1 (meters)
0.0  0.0
#   RFD-SubCoords2 (meters)
1500.2  1500
#   RFD-AverageSlope (%)
0.50
#  --BARRIERS
#   RFD-NumberBar
2
#   RFD-BarrierCoord1 (meters)
-1 0
#   RFD-BarrierCoords2 (meters)
0 1500
#   RFD-BarrierType
Snow fence
#   RFD-BarrierHeight (meters)
1.2
#   RFD-BarrierWidth (meters)
1
#   RFD-BarrierPorosity (%)
0.6
#   RFD-BarrierCoord (meters)
0 -2
1500.2 0
#   RFD-BarrierType
Sorghum(2 row)
#   RFD-BarrierHeight (meters)
2
#   RFD-BarrierWidth (meters)
2
#   RFD-BarrierPorosity (%)
0.5
#
#---------- END OF SIMULATION RUN FILE ------------
    \end{lstlisting}
%\end {multicols}

\caption{Testing display of a 2-column ASCII file. Note when font is set to "normalsize" this file's contents cause an "Overfull hbox" warning message due to the contents being too long to fit on the page with the Figure caption.  By using the now included "moresize" package, one can specify smaller relative font sizes (footnotesize", which is 8pt font size, selected for this Figure gets the file contents to fit on a single page in 2-columns, but due to some lines still being too long (and now wrapping)in the two column display. Changing the font size specification even smaller can remedy this issue. Just make sure the font size selected is not too small to easily read it, if we take that approach to resolving this issue. Note that there are several "fontsize" examples commented out for use with this Figure in the source file.  Font size "tiny" (about 5pt font size) allows this file's contents to both fit on a single page and not wrap the long lines within their individual columns.}
\label{fig:ASCII_file6}
\end{figure}


\begin{figure}[H]
\setlength{\columnsep}{.25in}
    \begin{lstlisting}[multicols=2]  
#------------ WEPS SIMULATION RUN FILE ------------
# Note: Lines beginning with '#' are comment lines.
#       Lines beginning with '#   RFD' are comments used by the interface.
#
# --USER INFORMATION
#   RFD-UserName
Dustin Fields
#   RFD-FieldNo RFD-TractNo RFD-FarmNo RFD-RunMode RFD-RunCycle RFD-RotCycle
789 | 456 | 123 | cycle | 2 | 2
#   RFD-SiteCounty and SiteState
Finney, Kansas
#
# --SITE INFORMATION
#   RFD-LatitudeSign RFD-Latitude
+38.00
#   RFD-LongitudeSign RFD-Longitude
-100.66
#   RFD-Elevation (meters)
801
#   RFD-CliGenStationID
CIMARRON
#   RFD-WindGenStationID
GARDEN CITY MUNI
#
# --SIMULATION PERIOD
#   RFD-StartDate (day_month_year)
01 01 01
#   RFD-EndDate (day_month_year)
31 12 4
#   RFD-TimeSteps (per_day)
24
#
# --RUN FILE NAMES (INPUT)
#   RFD-climate file
cli_gen.cli
#   RFD-wind file
win_gen.win
#   RFD-sub-daily file
none
#   RFD-SoilFile
Otero_101OF_100_FSL.ifc
#   RFD-ManageFile
KS_wheat_fallow.man
#
# --WEPS OUTPUT OPTIONS
#   RFD-OutputFile
output.tmp
#   RFD-ReportForm
0 0 0 0 0 0
#   RFD-OutputPeriod
2
#   RFD-SubmodelOutput
0 0 0 0 0 0
#   RFD-DebugOutput
0 0 0 0 0
#
# --SIMULATION REGION INFORMATION
#   RFD-RegionAngle (deg_clockwise_north)
21
#   RFD-SimCoords1 (meters)
0.0  0.0
#   RFD-SimCoords2 (meters)
1500.2  1500
#   RFD-ScaleFactors (place holder - needed for older versions of WEPS)
5.5 5.5
#
#   RFD-AcctRegNo
1
#   RFD-AcctCoords1 (meters)
    0.0  0.0 
#   RFD-AcctCoords2 (meters)
1500.2  1500
#
#   RFD-SubregionNo
1
#   RFD-SubCoords1 (meters)
0.0  0.0
#   RFD-SubCoords2 (meters)
1500.2  1500
#   RFD-AverageSlope (%)
0.50
#  --BARRIERS
#   RFD-NumberBar
2
#   RFD-BarrierCoord1 (meters)
-1 0
#   RFD-BarrierCoords2 (meters)
0 1500
#   RFD-BarrierType
Snow fence
#   RFD-BarrierHeight (meters)
1.2
#   RFD-BarrierWidth (meters)
1
#   RFD-BarrierPorosity (%)
0.6
#   RFD-BarrierCoord (meters)
0 -2
1500.2 0
#   RFD-BarrierType
Sorghum(2 row)
#   RFD-BarrierHeight (meters)
2
#   RFD-BarrierWidth (meters)
2
#   RFD-BarrierPorosity (%)
0.5
#
#---------- END OF SIMULATION RUN FILE ------------

#  --BARRIERS
#   RFD-NumberBar
2
#   RFD-BarrierCoord1 (meters)
-1 0
#   RFD-BarrierCoords2 (meters)
0 1500
#   RFD-BarrierType
Snow fence
#   RFD-BarrierHeight (meters)
1.2
#   RFD-BarrierWidth (meters)
1
#   RFD-BarrierPorosity (%)
0.6
#   RFD-BarrierCoord (meters)
0 -2
1500.2 0
#   RFD-BarrierType
Sorghum(2 row)
#   RFD-BarrierHeight (meters)
2
#   RFD-BarrierWidth (meters)
2
#   RFD-BarrierPorosity (%)
0.5
#
# This is now longer than one page for testing long listings - LEW
#---------- END OF SIMULATION RUN FILE ------------
    \end{lstlisting}

\caption{Testing display of a 2-column ASCII file. Note when font is set to "normalsize" this file's contents cause an "Overfull hbox" warning message due to the contents being too long to fit on the page with the Figure caption.  By using the now included "moresize" package, one can specify smaller relative font sizes (footnotesize", which is 8pt font size, selected for this Figure gets the file contents to fit on a single page in 2-columns, but due to some lines still being too long (and now wrapping)in the two column display. Changing the font size specification even smaller can remedy this issue. Just make sure the font size selected is not too small to easily read it, if we take that approach to resolving this issue. Note that there are several "fontsize" examples commented out for use with this Figure in the source file.  Font size "tiny" (about 5pt font size) allows this file's contents to both fit on a single page and not wrap the long lines within their individual columns.}
\label{fig:ASCII_file7}
\end{figure}

\end{document}