\documentclass[10pt,letterpaper, final]{report} % \documentclass{} required in all files

\usepackage{../preamble/myWEPS} % This is now our single preamble file inclusion (it assumes a “.sty” file extension)

\begin{document}
Output from either the current run or previous runs can be viewed
by using the \textbf{\textul{V}iewOutput} menu.
This menu allows the user to view output for the most recent (current) or previous runs.
Clicking on the \textbf{\textul{C}urrent Run} menu item displays a list of output reports
for the current (last completed WEPS simulation) run.
Clicking on the \textbf{\textul{P}revious Run} menu item displays a list of output reports for previous runs.
For this menu option,
a file chooser opens to allow the user to pick the desired run for which to view the output.
The \textbf{Multiple Run Manager} also allows the user to open a list of previous WEPS runs.
See the section of the WEPS User Manual titled:
“Viewing WEPS Output Reports”,
“Viewing Tabular Detail Reports”
and “Viewing Science Model Reports”
for a more detailed description of the individual WEPS output reports available

\end{document}